cellTimeMediumEMBASlot11 Entries 395 Mean 0.000259 RMS 0.8383 Underflow 0 Overflow 0 / ndf

2χ 8.993 / 7 Constant 2.65±

31.83 Mean 0.2948 ± 0.1005 Sigma 0.871± 1.674

time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 cells/0.1 ns

0 5 10 15 20 25 30 35 40

±