cellTimeMediumEMBASlot11 Entries 395 Mean 4.105e-10 RMS 0.582 Underflow 0 Overflow 0 / ndf

2χ 9.056 / 7 Constant 4.11± 60.01 Mean 0.03093 ± 0.05261 Sigma 0.0289 ± 0.5034

time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 cells/0.1 ns

0 10 20 30 40 50 60 70^{cellTimeMediumEMBASlot11}

± ±