cellTimeMediumEMBCSlot11 Entries 369 Mean 0.002116 RMS 0.8221 Underflow 0 Overflow 0 / ndf

2χ 3.43 / 7 Constant 2.59±

29.82 Mean 0.4926 ± -0.2385 Sigma 1.432± 1.934

time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 cells/0.1 ns

0 5 10 15 20 25 30 35

±