cellTimeMediumEMBCSlot11 Entries 369 Mean -4.016e-10 RMS 0.5324 Underflow 0 Overflow 0 / ndf

2χ 1.074 / 7 Constant 4.08±

57.07 Mean 0.03139 ± 0.01285 Sigma 0.0317 ± 0.5097

time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 cells/0.1 ns

0 10 20 30 40 50 60

± ±