cellTimeMediumEMBCSlot11 Entries 369 Mean -1.391e-09 RMS 0.502 Underflow 0 Overflow 0 / ndf

2χ 5.428 / 7 Constant 4.37±

63.27 Mean 0.025833 ± 0.007798 Sigma 0.022± 0.442

time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 cells/0.1 ns

0 10 20 30 40 50 60

±