cellTimeMediumEMBCSlot12 Entries 557 Mean 0.04591 RMS 0.8511 Underflow 0 Overflow 0 / ndf

2χ 1.802 / 7 Constant 3.72±

54.99 Mean 0.07478 ± 0.01843 Sigma 0.1357 ± 0.9217

time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 cells/0.1 ns

0 10 20 30 40 50 60

± ±