cellTimeMediumEMBCSlot12 Entries 557 Mean 0.06419 RMS 0.8383 Underflow 0 Overflow 0 / ndf

2χ 2.826 / 7 Constant 3.74±

56.69 Mean 0.06725 ± 0.07175 Sigma 0.1059 ± 0.8511

time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 cells/0.1 ns

0 10 20 30 40 50

± ±