cellTimeMediumEMBCSlot12 Entries 557 Mean 7.146e-10 RMS 0.6739 Underflow 0 Overflow 0 / ndf

2χ 9.426 / 7 Constant 4.78±

81.37 Mean 0.02724 ± 0.01633 Sigma 0.0272 ± 0.5247

time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 cells/0.1 ns

0 10 20 30 40 50 60 70 80 90

± ±