cellTimeMediumEMBCSlot12 Entries 557 Mean 4.749e-10 RMS 0.6393 Underflow 0 Overflow 0 / ndf

2χ 3.245 / 7 Constant 4.82±

83.93 Mean 0.0268 ± 0.0113 Sigma 0.0265 ± 0.5251

time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 cells/0.1 ns

0 10 20 30 40 50 60 70 80 90

± ±