cellEnergyMediumEMBASlot11

Entries 913 Mean 23.57 RMS 10.2 Underflow 0 Overflow 0

energy [GeV]

0 20 40 60 80 100 120 140 cells/0.5 GeV

0 20 40 60 80 100