cellEnergyMediumEMBCSlot12

Entries 1979 Mean 20.69 RMS 8.912 Underflow 0 Overflow 0

energy [GeV]

0 10 20 30 40 50 60 70 80 cells/0.5 GeV

0 20 40 60 80 100 120