cellEnergyProfileMediumEMBCSlot13

Entries 192 Mean 31.9 Mean y -0.03559 RMS 16.23 RMS y 0.6529 Underflow 0 Overflow 0

energy [GeV]

0 20 40 60 80 100 time [n]

-1.5 -1 -0.5 0 0.5 1