cellEnergyProfileMediumEMBCSlot14

Entries 67 Mean 48.83 Mean y 0.03572 RMS 12.81 RMS y 0.779 Underflow 0 Overflow 0

energy [GeV]

0 20 40 60 80 100 120 time [n]

-1.5 -1 -0.5 0 0.5 1 1.5