cellTimeMediumEMBASlot11

Entries 913 Mean 0.1452 RMS 0.8027 Underflow 0 Overflow 0

time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 cells/0.1 ns

0 20 40 60 80 100 120