cellTimePVProfileMediumEMBASlot13

Entries 64 Mean 11.03 Mean y -0.2074 RMS 55.92 RMS y 1.053 Underflow 0 Overflow 0

PV position [mm]

-250-200-150-100 -50 0 50 100 150 200 250 time [ns]

-1 0 1 2 3