cellTimePhiProfileMediumEMBASlot12

Entries 569 Mean 0.01238 Mean y -0.3195 RMS 1.772 RMS y 0.8058 Underflow 0 Overflow 0

[rad] ϕ -3 -2 -1 0 1 2 3 time [ns]

-1.5

-1

-0.5

0

0.5