cellTimePhiProfileMediumEMBCSlot12

Entries 1979 Mean 0.5017 Mean y -0.01707 RMS 1.623 RMS y 0.9369 Underflow 0 Overflow 0

[rad] ϕ -3 -2 -1 0 1 2 3 time [ns]

-1 -0.5 0 0.5 1 1.5 2