cellTimePhiProfileMediumEMBCSlot13

Entries 192 Mean -0.1872 Mean y -0.03559 RMS 0.9035 RMS y 0.6529 Underflow 0 Overflow 0

[rad] ϕ -3 -2 -1 0 1 2 3 time [ns]

-1.5 -1 -0.5 0 0.5 1