cellTimePhiProfileMediumEMBCSlot14

Entries 67 Mean 0.6551 Mean y 0.03572 RMS 1.83 RMS y 0.779 Underflow 0 Overflow 0

[rad] ϕ -3 -2 -1 0 1 2 3 time [ns]

-1 -0.5 0 0.5 1 1.5