The Balloon Borne Liquid Xenon Gamma-Ray Imaging Telescope (LXeGRIT)

The LXeGRIT Time Projection Chamber a 30 kg Xe detector sensitive to 0.2-20 MeV

LXeGRIT as balloon-borne payload May 7, 1999 Flight