1.121.12

1.101.10

1.081.08

1.061.06

1.041.04

1.021.02

1.001.00

0.10.1

111010

100100

10001000Q2 [GeV2]

0.310.31

0.300.30

0.290.29

0.280.28

0.270.27

0.260.26

0.250.25

F2 (eP) = F2 (nFe)*

F2 (l) / F2 (n)* F2 (D) / F2 (Ca)*

F2 (N+P) / F2 (D) *

F2 (P) / F2 (N+P)

Total correction =

* **0.550.55

0.500.50

0.450.45

0.400.40

0.350.35

F

2

P0.10.1

111010

100100

10001000Q2 [GeV2] x=0.0175 CCFR Fe corrected to proton

NMC proton