0.500.50

0.400.40

0.300.30

F

2

P0.1101001000 x=0.008 CCFR NMC 0.500.50

0.400.40

0.300.30

F

2

P0.1101001000 x=0.013 CCFR NMC 0.500.50

0.400.40

0.300.30

F

2

P0.1101001000 x=0.018 CCFR NMC 0.500.50

0.400.40

0.300.30

F

2

P0.1101001000 x=0.025 CCFR NMC

F

2 x=0.035 CCFR

F

2 x=0.05 CCFR

F

2 x=0.07 CCFR

17-Jul-97

WGSComparison of NMC F2m-p with CCFR F2n-Fe. CCFR data has been converted to l-D witha heavy target correction, quark-charge correction, free (N+P) vs P correction, and a free(N+P) vs. bound D correction. All statistical and systematic errors have been added inquadrature.Q2 [GeV2]1 of 2