0.400.40

0.300.30

F

2

P0.1101001000 x=0.09 CCFR NMC 0.400.40

0.300.30

F

2

P0.1101001000 x=0.11 CCFR NMC 0.400.40

0.300.30

F

2

P0.1101001000 x=0.14 CCFR NMC 0.400.40

0.300.30

F

2

P0.1101001000 x=0.18 CCFR NMC

F

2 x=0.225 CCFR

0.320.32

0.280.28

0.240.24

F

2 x=0.275 CCFR

0.280.28

0.240.24

0.200.20

F

2 x=0.35 CCFR

0.200.20

0.160.16

0.120.12

F

2 x=0.45 CCFR

17-Jul-97

WGSQ2 [GeV2]2 of 2