NC1W1NC1Q1NC1DENC1Q2NC1Q3NC1W2NC1DENC1W3NC1Q4NC1Q5NC1Q6NC1Q7NC1TORBeamTimingMonitorNC1TGTBeO TargetPassiveCollimatorH2O Cooled