0.80.8

0.70.7

0.60.6

0.50.5

0.40.4

0.30.3

0.20.2

s

/E [10

-38 cm

2

/GeV]

350350

300300

250250

200200

150150

100100

5050

00Energy [GeV]

sn/ Esn�/ E

CCFRR (85)

CDHS (87)

CCFR (90) CCFR (96)