10001000

900900

800800

700700

600600

500500

Number of Anti-neutrino Events

2020

1515

1010

5500EHAD [GeV]

E744 anti-neutrinos En— = 75 GeVB/A = -1.651 – .172c2 = 8.0 / 6 DOF