200200

150150

100100

5050 00

E744 Flux * Energy x10

3

350350

300300

250250

200200

150150

100100

5050

00Energy [GeV] 00

E770 Flux * Energy x10

3

E744 Neutrino flux

E744 Anti-neutrino flux

E770 Neutrino flux

E770 Anti-neutrino flux