MC

F NEW

FESTqESTFlux ExtractionDataRe-weight MC byFNEWFEST

Structure-Function ExtractionF NEW qNEWFEST

qEST

F2,xF3 qNEW

(1)(2)(3)(4)(5)(6)(7)(8)Loop