1.71.61.51.41.3x = 0.0075

1.61.41.2x = 0.0125

1.61.4x = 0.018

1.81.61.41.2x = 0.025

1.5x = 0.035

1.61.41.2x = 0.050

1.601.501.401.30x = 0.070

1.601.501.401.30x = 0.090

1.601.501.401.301246810246810024681000 x = 0.110

1.401.351.301.251.20x = 0.140

1.251.201.151.101.05x = 0.180

1.101.051.000.95x = 0.225

0.900.800.70x = 0.275

0.700.600.50x = 0.350

0.400.30x = 0.450

0.300.250.200.15x = 0.550

0.120.100.080.06x = 0.650

0.040.030.020.011246810246810024681000 x = 0.750Q2 [GeV/c2]