0.250.200.150.10x = 0.0075

0.280.240.20x = 0.0125

0.400.300.20x = 0.018

0.400.30x = 0.025

0.600.500.40x = 0.035

0.700.600.500.40x = 0.050

0.600.500.40x = 0.070

0.800.700.60x = 0.090

0.700.601246810246810024681000 x = 0.110

0.850.800.750.70x = 0.140

0.900.850.80x = 0.180

0.850.800.750.70x = 0.225

0.70x = 0.275

0.700.600.50x = 0.350

0.400.30x = 0.450

0.300.250.200.15x = 0.550

0.120.100.080.06x = 0.650

0.040.030.020.011246810246810024681000 x = 0.750Q2 [GeV/c2]