1.61.6

1.41.4

1.21.2

1.01.0

0.80.8

0.60.6

0.40.4

0.20.2

0.00.0

F

21122334455667788991010

2233445566778899100100

223344556677889910001000Q2 [GeV2/c2]

1.01.0 x=.0075x=.0125x=.0175x=.025x=.035x=.050x=.070x=.090x=.110x=.140x=.180x=.225x=.275x=.350x=.450x=.550x=.650x=.750CCFR F2 x-bins

.0075 .140

.0125

.180

.0175

.225

.025

.275 .035

.350

.050

.450

.070 .550

.090

.650

.110

.750

D&O QCD Fit

Extrapolated Fit