0.010.01

22334455667788990.10.1

22334455667788

F

2 and xF

31122334455667788991010

2233445566778899100100

223344556677889910001000Q2 [GeV2/c2] x=.350x=.450x=.550x=.650x=.750F2 x = .350 x = .450 x = .550 x = .650 x = .750 CCFR F2 and xF3 High-xxF3 x = .350 x = .450 x = .550 x = .650 x = .750

D&O QCD Fit

Extrapolated Fit