2.02.0

1.51.5

1.01.0

0.50.5

0.00.0

-0.5-0.5

D

4

(x,Q

2

= 25 GeV

2

) [GeV

4

]0.80.8

0.60.6

0.40.4

0.20.2

0.00.0x

D4 contribution

F2 calculated xF3 calculated

2xF1 calculated