2.52.01.51.00.50.00.80.40.0Q2 = 5.0 GeV2

2.52.01.51.00.50.00.80.40.0Q2 = 7.9 GeV2

2.52.01.51.00.50.00.80.40.0Q2 = 12.6 GeV2

2.52.01.51.00.50.00.80.40.0Q2 = 20.0 GeV2

2.52.01.51.00.50.00.80.40.0Q2 = 31.6 GeV2

2.52.01.51.00.50.00.80.40.0Q2 = 50.1 GeV2

2.52.01.51.00.50.00.80.40.0Q2 = 79.4 GeV2

2.52.01.51.00.50.00.80.40.0Q2 = 125.9 GeV2CCFRF2 vs. x in Q2 bins

F2 QCD Fitx