1212

1010

8866442200 xG(x) at Q

= 32 GeV

255667788990.010.01

22334455667788990.10.1

223344556677x –1s Gluon error from CCFR data –1s Gluon error from E665

Gluons from H1 Jets

CTEQ4M

GRV 94 HO

MRS R2