1.11.1

1.01.0

0.90.9

0.80.8

0.70.7

F

2

(X) / F

2

(D)0.0010.001

2233445566770.010.01

2233445566770.10.1

22334455667711x NMC Ca/D

SLAC E87 Fe/D SLAC E139 Fe/D

E665 Ca/D

Parameterization

Error in parameterization