1.81.8

1.61.6

1.41.4

1.21.2

1.01.0

0.80.8

0.1101001000 x=.050 NMC

E665

CCFR

MRS R2

CTEQ 4M

GRV 94 HO x=.035 NMC x=.0250 NMC

GRV 94 HOQ2 [GeV2/c2]F2