1.41.4

1.31.3

1.21.2

1.11.1

1.01.0

0.90.9

0.1101001000 x=.225 NMC

SLAC

BCDMS

CCFR

MRS R2

CTEQ 4M

GRV 94 HO x=.180 NMC

E665 x=.140 NMC

GRV 94 HOQ2 [GeV2/c2]F2