PLACE - SHEND, -1 .lt. Ehad .lt. 4 Xsec Cuts

Hadron Shower Length - Data vs. MC

0 10000

20000

30000

40000

50000

60000

0 10 20 30 40

PLACE - SHEND, 4 .lt. Ehad .lt. 10 Xsec Cuts 0 5000

10000

15000

20000

25000

30000

0 10 20 30 40

PLACE - SHEND, 10 .lt. Ehad .lt. 20 Xsec Cuts 0 5000

10000

15000

20000

25000

30000

35000

0 10 20 30 40

PLACE - SHEND, 20 .lt. Ehad .lt. 40 Xsec Cuts 0 5000

10000

15000

20000

25000

30000

35000

40000

0 10 20 30 40